<script setup lang="ts">
const currentYear = new Date().getFullYear()
</script>

<template>
  <footer class="footer">
    <div class="footer-content">
      <div class="footer-main">
        <!-- Logo & Description Column -->
        <div class="footer-section">
          <div class="footer-logo">
            <NuxtLink to="/">
              <img src="/img/experimenta-logo-white.svg" alt="experimenta Logo" class="footer-logo-svg" />
            </NuxtLink>
          </div>
          <p>
            experimenta ist Deutschlands größtes Science Center. Mit über 275 Mitmachstationen, vier
            Kreativstudios, neun Laboren und einer Sternwarte.
          </p>
        </div>

        <!-- Quick Links Column -->
        <div class="footer-section">
          <h3>Rechtliches</h3>
          <ul class="footer-links">
            <li><a href="#">Impressum</a></li>
            <li><a href="#">Datenschutz</a></li>
            <li><a href="#">AGB</a></li>
          </ul>
        </div>

        <!-- Info Column -->
        <div class="footer-section">
          <h3>Über uns</h3>
          <ul class="footer-links">
            <li><a href="#">experimenta Shop</a></li>
            <li><a href="#">Kontakt</a></li>
          </ul>
        </div>

        <!-- Contact Column -->
        <div class="footer-section">
          <h3>Kontakt</h3>
          <p>experimenta gGmbH<br />Experimenta-Platz<br />74072 Heilbronn</p>
          <p>
            <a href="mailto:info@experimenta.science" class="footer-link">info@experimenta.science</a>
          </p>
        </div>
      </div>

      <!-- Footer Bottom -->
      <div class="footer-bottom">
        <p>&copy; {{ currentYear }} experimenta gGmbH. Alle Rechte vorbehalten.</p>
      </div>
    </div>
  </footer>
</template>

<style scoped>
.footer {
  background: linear-gradient(135deg, #1a0a3a 0%, #0f051d 100%);
  margin-top: 80px;
  position: relative;
}

.footer-content {
  max-width: 1200px;
  margin: 0 auto;
  padding: 60px 20px 30px;
}

.footer-main {
  display: grid;
  grid-template-columns: 2.5fr 1fr 1fr 1.5fr;
  gap: 50px;
  margin-bottom: 50px;
}

.footer-section h3 {
  color: #f59d24;
  margin-bottom: 20px;
  font-size: 1.25rem;
  font-weight: 600;
  text-transform: uppercase;
  letter-spacing: 0.5px;
}

.footer-section p {
  margin-bottom: 15px;
  color: rgba(255, 255, 255, 0.8);
  line-height: 1.6;
  font-size: 14px;
}

.footer-links {
  list-style: none;
  padding: 0;
  margin: 0;
}

.footer-links li {
  margin-bottom: 8px;
}

.footer-links a,
.footer-link {
  color: rgba(255, 255, 255, 0.8);
  text-decoration: none;
  font-size: 14px;
  transition: color 0.3s ease;
}

.footer-links a:hover,
.footer-link:hover {
  color: #ff4081;
}

.footer-logo {
  display: flex;
  align-items: center;
  margin-bottom: 20px;
}

.footer-logo-svg {
  width: 200px;
  height: auto;
}

.footer-bottom {
  border-top: 1px solid rgba(255, 255, 255, 0.1);
  padding-top: 30px;
  text-align: center;
}

.footer-bottom p {
  color: rgba(255, 255, 255, 0.8);
  font-size: 14px;
  margin: 0;
}

/* Responsive Design */
@media (max-width: 768px) {
  .footer-main {
    grid-template-columns: 1fr;
    gap: 30px;
  }

  .footer-logo-svg {
    width: 150px;
  }
}
</style>
